<template>
  <div class="min-h-screen w-full flex flex-col items-center justify-center">
    <a href="https://babyghosts.fund/ghost-guild" class="text-center">
      <h1 class="text-display-xl font-bold mb-4">Ghost Guild</h1>
      <p class="text-display-sm text-guild-400">Coming Soon</p>
    </a>
  </div>
</template>

<script setup>
definePageMeta({
  layout: "coming-soon",
});
</script>
